   This option allows you to create a chart of the current image.$
You can select to create the full chart, or create a chart of a  $
section of the image. If you choose to select an section of the  $
image to chart, you will be put into the image viewer mode to    $
select the section.                                              $
$
    This mode will allow you to define a section of the image to$
chart. These options are:                                       $
$
    MOVE BOX - The entire box will follow the movement of the   $
     mouse.                                             $
$
    MOVE TOP EDGE OF BOX                                   $
    MOVE BOTTOM EDGE OF BOX                                $
    MOVE LEFT EDGE OF BOX                                  $
    MOVE RIGHT EDGE OF BOX - These options allow you to move any $
    1 side  of the box.                          $
$
    CHART THIS SECTION - The area encompassed by the box will be $
    chart.                                         $
$
    In either case, when you are ready to create the chart you   $
have 2 options:  Print the chart on the printer or create a PCX  $
file of the chart.  If you choose to create a PCX file of the    $
chart, you will be presented a window showing the files in the   $
current print directory. You can change the directory, select a  $
file, or enter a name for a new file. The image will then be     $
charted to the file.                                             $
$
    If there is no pcxccspt.cfg file present, a PCX file is the $
default, otherwise the printer is the default. To create a       $
pcxccspt.cfg file see the Manual section entitled  "CREATING THE $
PRINTER CONFIGURATION FILE"                                      $
$
    If you choose to print to the printer you will be presented  $
the following information:                                       $
      Page Height (H):                                           $
      Page Width (W):                                            $
      Title etc (T):                                             $
    Changing the Page height and or width will change how much of$
the chart can be printed in each page. Using the Title field, you$
can add up to 50 characters for a title, copyright or other      $
information. Select OK when the information is correct.          $
$
    In addition to any title, on the top of each page will ba a  $
page number, for example page 1.1, page 1.2, page 2.1 The first  $
number is the "column" the second number is the row. This        $
information is presented to help with multi-paged charts.        $
$
    If the chart of the image plus the symbol table take up more $
than 1 page, the symbol table will be printed on a separate page.$

